conna_NFS_CIFS_FR4:FS_CON_MFC:5GB:3GB:26%:
conna_NFS_CIFS_FR4:FS_SAP_HANA_BU:3072GB:1431GB:53%:
conna_NFS_CIFS_FR4:FS_SAP_HANA_SANDBOX:526GB:231GB:53%:
conna_NFS_CIFS_FR4:NC_BACKUP:90GB:74GB:16%:
conna_NFS_CIFS_FR4:SUP_ARCHIVE:600GB:324GB:45%:
conna_NFS_CIFS_FR4:axilxsapdb1_data:480GB:204GB:57%:
conna_NFS_CIFS_FR4:axilxsapdb1_log:270GB:243GB:9%:
conna_NFS_CIFS_FR4:axilxsapdb1_shared:350GB:332GB:4%:
conna_NFS_CIFS_FR4:axilxsapdb2_data:320GB:77GB:75%:
conna_NFS_CIFS_FR4:axilxsapdb2_log:130GB:112GB:13%:
conna_NFS_CIFS_FR4:axilxsapdb2_shared:270GB:240GB:10%:
conna_NFS_CIFS_FR4:axilxsapdb3_data:320GB:84GB:73%:
conna_NFS_CIFS_FR4:axilxsapdb3_log:130GB:110GB:15%:
conna_NFS_CIFS_FR4:axilxsapdb3_shared:250GB:236GB:5%:
conna_NFS_CIFS_FR4:axitransx:150GB:136GB:8%:
conna_NFS_CIFS_FR4:bmu_nc:1536GB:282GB:81%:
conna_NFS_CIFS_FR4:conesxsas01:6144GB:6135GB:0%:
conna_NFS_CIFS_FR4:conlxdectdb_oracle_data:3341GB:3173GB:0%:
conna_NFS_CIFS_FR4:conlxdectdb_oracle_dpdump:3449GB:3275GB:0%:
conna_NFS_CIFS_FR4:conlxdectdb_oracle_recovery:3341GB:3173GB:0%:
conna_NFS_CIFS_FR4:conna_NFS_CIFS_FR4_root:1GB:0GB:1%:
conna_NFS_CIFS_FR4:ksa_db_backup:700GB:699GB:0%:
conna_NFS_CIFS_FR4:test_bmu_nc:60GB:9GB:84%:
conna_NFS_CIFS_FR4:val_uxbackup:30GB:29GB:0%:
conna_NFS_CIFS_FR4:vol_kubernetes:50GB:49GB:0%:
conna_NFS_CIFS_FR4:vvilxsap1_data:250GB:52GB:78%:
conna_NFS_CIFS_FR4:vvilxsap1_log:64GB:55GB:13%:
conna_NFS_CIFS_FR4:vvilxsap1_shared:178GB:89GB:49%:
conna_NFS_CIFS_FR4:vwd_nc:150GB:149GB:0%:
conna_iSCSI_FR4:conna_iSCSI_FR4_root:1GB:0GB:0%:
conna_iSCSI_FR4:lun_RELW16BEPO1_db_vol:250GB:26GB:89%:
connac1:MDV_CRS_b2870ee79aec11e8a54e00a098db3d27_A:10GB:9GB:0%:
connac1:MDV_CRS_b2870ee79aec11e8a54e00a098db3d27_B:10GB:9GB:0%:
connan1:vol0:677GB:580GB:9%:
tsona_NFS_CIFS_FR4:buildd_deployments:200GB:71GB:64%:
tsona_NFS_CIFS_FR4:buildd_deployments2:20GB:19GB:0%:
tsona_NFS_CIFS_FR4:feedarchiverp_data_archive:5632GB:1605GB:71%:
tsona_NFS_CIFS_FR4:feedstore_dev:300GB:299GB:0%:
tsona_NFS_CIFS_FR4:lomx_dev:200GB:181GB:9%:
tsona_NFS_CIFS_FR4:lomx_prd:200GB:129GB:35%:
tsona_NFS_CIFS_FR4:lomx_uat:200GB:108GB:42%:
tsona_NFS_CIFS_FR4:tsona_NFS_CIFS_FR4_root:1GB:0GB:1%:
tsona_iSCSI_p_FR4:lun_feedarchiver_p:550GB:65GB:88%:
tsona_iSCSI_p_FR4:tsona_iSCSI_p_FR4_root:1GB:0GB:1%:
tsona_iSCSI_p_FR4:vol_tso_REPL_PRD_u20:61GB:10GB:82%:
tsona_iSCSI_p_FR4:vol_tso_REPL_PRD_u21:5632GB:449GB:92%:
tsona_iSCSI_p_FR4:vol_tso_REPL_PRD_u22:550GB:47GB:91%:
tsona_iSCSI_p_FR4:vol_tso_esx01p:4915GB:561GB:88%:
tsona_iSCSI_p_FR4:vol_tso_esx03t:8396GB:595GB:92%:
tsona_iSCSI_t_FR4:lun_feedarchiver_d:550GB:437GB:20%:
tsona_iSCSI_t_FR4:lun_feedarchiver_u:550GB:59GB:89%:
tsona_iSCSI_t_FR4:tsona_iSCSI_t_FR4_root:1GB:0GB:0%:
tsona_iSCSI_t_FR4:vol_tso_REPL_DEV_u60:62GB:12GB:80%:
tsona_iSCSI_t_FR4:vol_tso_REPL_DEV_u61:140GB:17GB:87%:
tsona_iSCSI_t_FR4:vol_tso_REPL_DEV_u62:90GB:10GB:88%:
tsona_iSCSI_t_FR4:vol_tso_REPL_UAT_u40:63GB:12GB:79%:
tsona_iSCSI_t_FR4:vol_tso_REPL_UAT_u41:310GB:58GB:81%:
tsona_iSCSI_t_FR4:vol_tso_REPL_UAT_u42:550GB:45GB:91%:
conna_NFS_CIFS_FR2:conna_NFS_CIFS_FR2_root:1GB:0GB:0%:
conna_iSCSI_FR2:conna_iSCSI_FR2_root:1GB:0GB:0%:
connac2:MDV_CRS_947f8ea69a4911e8a79e00a098db4960_A:10GB:9GB:0%:
connac2:MDV_CRS_947f8ea69a4911e8a79e00a098db4960_B:10GB:9GB:0%:
connan2:vol0:677GB:580GB:9%:
plixxent_iSCSI_FR2:plixxent_iSCSI_FR2_root:1GB:0GB:0%:
tsona_NFS_CIFS_FR2:tsona_NFS_CIFS_FR2_root:1GB:0GB:0%:
tsona_NFS_CIFS_FR2:vol_DATA_PRD_nfs_01:105GB:99GB:0%:
tsona_NFS_CIFS_FR2:vol_REPL_PRD_feedrep:321GB:303GB:0%:
tsona_NFS_CIFS_FR2:vol_REPL_PRD_nfs_02:53GB:50GB:0%:
tsona_NFS_CIFS_FR2:vol_REPL_UAT_feedrep:108GB:102GB:0%:
tsona_NFS_CIFS_FR2:vol_data_prod_nfs:2355GB:885GB:62%:
tsona_NFS_CIFS_FR2:vol_feed_p_log:211GB:200GB:0%:
tsona_NFS_CIFS_FR2:vol_feed_u_log:106GB:22GB:77%:
tsona_NFS_CIFS_FR2:vol_repl_prod_nfs:8192GB:1212GB:70%:
tsona_NFS_CIFS_FR2:vol_tso_data_uat_nfs:1945GB:767GB:60%:
tsona_NFS_CIFS_FR2:vol_tso_install:200GB:158GB:20%:
tsona_NFS_CIFS_FR2:vol_tso_prd_systemlogs:225GB:34GB:84%:
tsona_NFS_CIFS_FR2:vol_tso_repl_uat_nfs:800GB:614GB:23%:
tsona_NFS_CIFS_FR2:vol_tso_uat_systemlogs:200GB:66GB:66%:
tsona_iSCSI_p_FR2:tsona_iSCSI_p_FR2_root:1GB:0GB:0%:
tsona_iSCSI_t_FR2:tsona_iSCSI_t_FR2_root:1GB:0GB:0%:
